Chamber Electronics Box BOXv11, Padova 9 feb 1999

34

11 22

50

107

11

11

11 6

6 23 19

7

50

16

18

17

32

EXT VETO

POWER

WATER

WATER

SLOW CONTROL

EXT TRG

VETO

PHI THETA

SLOW

POWER SUPPLY

WATER

CONTROL

9

14

TTC TTC 18

11

11

41

23

WATER

16

11

2

22

8

2200u 6.3V

1000u 10V

PHI THETA

TRG

TTC

SUPPLY

SLOW

CONTROL

IO side: Power supply decoupling board Power supply cable outlet Water connections TTC, Trigger sync IOs, Slow Control

Box section: Panel IOs

Electronics section: Trigger and Readout boards Internal cabling Cooling system