SCB Trigger Optical

Link

ck

ST1

                                                          (25+16+1)

2

Control

142

12

ST2

                                                          (25+16+1)

ST3

                                                          (15+16+1)

ST4

                                                          (25+1)

40MHz

Padova, may 21, 1999